The Fortran Environment dialog box lets you view the Visual Fortran default compiler settings (upper half) as well as the compiler and linker settings for each Fortran Static Library environment that you select (lower half).

In the List of Static Library Environments box, select a saved Fortran Static Library environment whose tool project settings options you want to display.

After you select the saved Fortran Static Library environment that will be the basis for the new project, click the Apply button. Or, you can click Cancel to not use a saved Fortran Static Library environment.

After your project is created, you can display the project settings dialog box by opening the project workspace and click the Settings option from the Project menu. Project settings allow you to view and change the compiler options (Fortran tab), as well as options for other tools (Debug tab, Link tab, and so on).